[ver]
	4
[files]
[charset]
	82
	ANSI (Windows, IBM CP 1252)
[revisions]
	0
[prn]
	HP LaserJet III
[port]
	LPT1:
[lang]
	1
[desc]
	Bibliographic reference style sheet for the PsychLit Macros.
	
	
	
	
	746476027
	1
	746475701
	5
	1
	0
	0
	0
	0
	
	
	
	
	
	
	1
[fopts]
	0
	1
	0
	0
[lnopts]
	2
	Body Text
	1
[docopts]
	5
	2
[GramStyle]
	
[tag]
	Body Text
	2
	[fnt]
		Times New Roman
		240
		0
		49152
	[algn]
		1
		1
		0
		0
		0
	[spc]
		17
		288
		1
		0
		0
		1
		100
	[brk]
		4
	[line]
		8
		0
		1
		0
		1
		1
		1
		10
		10
		1
	[spec]
		0
		0
		
		0
		1
		0
		0
		0
		0
		0
	[nfmt]
		280
		1
		2
		.
		,
		$
	Body Text
	0
	0
[tag]
	Reference
	3
	[fnt]
		Times New Roman
		240
		0
		49152
	[algn]
		1
		1
		0
		0
		720
	[spc]
		17
		288
		1
		0
		144
		1
		100
	[brk]
		4
	[line]
		8
		0
		1
		0
		1
		1
		1
		10
		10
		1
	[spec]
		0
		0
		
		0
		1
		0
		0
		0
		0
		0
	[nfmt]
		280
		1
		2
		.
		,
		$
	Reference
	0
	0
[lay]
	Standard
	641
	[rght]
		15840
		12240
		1
		1440
		1440
		1
		1440
		1440
		0
		1
		0
		1
		1
		1
		1
		1440
		10800
		0
	[hrght]
	[lyfrm]
		1
		11208
		0
		0
		12240
		1440
		1
		1
		3
		1 0 0 0 0 0 0
		0
		0
		1
	[frmlay]
		1440
		12240
		1
		1440
		0
		1
		720
		1440
		0
		1
		0
		1
		1
		1
		1
		1440
		10800
		0
	[txt]
>
	[frght]
	[lyfrm]
		1
		13256
		0
		14400
		12240
		15840
		1
		1
		3
		1 0 0 0 0 0 0
		0
		0
		2
	[frmlay]
		15840
		12240
		1
		1440
		0
		1
		14400
		1440
		0
		1
		0
		1
		1
		1
		1
		1440
		10800
		0
	[txt]
>
[elay]
[edoc]
